CANNES, FRANCE - MAY 25:  Actress Tilda Swinton attends the 'Only Lovers Left Alive' premiere during The 66th Annual Cannes Film Festival at the Palais des Festivals on May 25, 2013 in Cannes, France.  (Photo by Ian Gavan/Getty Images)