LONDON, ENGLAND - NOVEMBER 27:  Stella McCartney , winner of Designer of the Year poses in the awards room at the British Fashion Awards 2012 at The Savoy Hotel on November 27, 2012 in London, England.  (Photo by Ian Gavan/Getty Images)