HOLLYWOOD, CA - FEBRUARY 28: Actress Julianne Moore attends the 88th Annual Academy Awards at Hollywood &amp; Highland Center on February 28, 2016 in Hollywood, California.  (Photo by Jason Merritt/Getty Images)