{"defaults":{"title":"Pirates of the Caribbean: On Stranger Tides Premiere - 64th Annual Cannes Film Festival","alt":"Pirates of the Caribbean: On Stranger Tides Premiere - 64th Annual Cannes Film Festival","caption":"CANNES, FRANCE - MAY 14:  Actors Johnny Depp (L) and Penelope Cruz attend the Pirates of the Caribbean: On Stranger Tides premiere at the Palais des Festivals during the 64th Cannes Film Festival on May 14, 2011 in Cannes, France.  (Photo by Andreas Rentz\/Getty Images)","copyright":"2011 Getty Images"},"items":[{"id":"images\/6219","file":"2011\/05\/114178123.jpg","status":"clean","service":"content","attributes":{"title":"Pirates of the Caribbean: On Stranger Tides Premiere - 64th Annual Cannes Film Festival","alt":"Pirates of the Caribbean: On Stranger Tides Premiere - 64th Annual Cannes Film Festival","caption":"CANNES, FRANCE - MAY 14:  Actors Johnny Depp (L) and Penelope Cruz attend the Pirates of the Caribbean: On Stranger Tides premiere at the Palais des Festivals during the 64th Cannes Film Festival on May 14, 2011 in Cannes, France.  (Photo by Andreas Rentz\/Getty Images)","copyright":"2011 Getty Images"},"tags":[],"info":{"height":"750","width":"500","size":362299,"format":"jpg","created":"2017-12-08T08:39:43+00:00","cached":1512722383,"source":"\/danijelapilic\/files\/2011\/05\/114178123.jpg","custom":"\/\/files\/2011\/05\/114178123.jpg"}}]}