NEW YORK, NY - MAY 01:  Musician Florence Welch attends the 'The Great Gatsby' world premiere at Avery Fisher Hall at Lincoln Center for the Performing Arts on May 1, 2013 in New York City.  (Photo by Jemal Countess/Getty Images)