LONDON, ENGLAND - DECEMBER 05:  Best Supporting Actress Nominee Lesley Manville attends the Moet British Independent Film Awards at Old Billingsgate Market on December 5, 2010 in London, England.  (Photo by Gareth Cattermole/Getty Images) *** Local Caption *** Lesley Manville