TORONTO, ON - SEPTEMBER 09:  Actress Julianne Moore attends the 'Maps to the Stars' premiere during the 2014 Toronto International Film Festival at Roy Thomson Hall on September 9, 2014 in Toronto, Canada.  (Photo by Jason Merritt/Getty Images)