LOS ANGELES, CA - SEPTEMBER 20:  TV personality/model Heidi Klum attends the 67th Annual Primetime Emmy Awards at Microsoft Theater on September 20, 2015 in Los Angeles, California.  (Photo by Jason Merritt/Getty Images)