{"defaults":{"title":"68th Annual Primetime Emmy Awards - Arrivals","alt":"68th Annual Primetime Emmy Awards - Arrivals","caption":"LOS ANGELES, CA - SEPTEMBER 18:  TV personality Heidi Klum attends the 68th Annual Primetime Emmy Awards at Microsoft Theater on September 18, 2016 in Los Angeles, California.  (Photo by Frazer Harrison\/Getty Images)","copyright":"2016 Getty Images"},"items":[{"id":"images\/33747","service":"content","status":"clean","attributes":{"title":"68th Annual Primetime Emmy Awards - Arrivals","alt":"68th Annual Primetime Emmy Awards - Arrivals","caption":"LOS ANGELES, CA - SEPTEMBER 18:  TV personality Heidi Klum attends the 68th Annual Primetime Emmy Awards at Microsoft Theater on September 18, 2016 in Los Angeles, California.  (Photo by Frazer Harrison\/Getty Images)","copyright":"2016 Getty Images"},"tags":[],"options":[],"info":{"height":750,"width":500,"size":157714,"format":"jpg","created":"2017-12-08T08:40:25+00:00","cached":1512722425,"source":"\/danijelapilic\/files\/2016\/09\/GettyImages-607642828_master.jpg","custom":"\/\/files\/2016\/09\/GettyImages-607642828_master.jpg"}}]}