{"defaults":{"title":"Reparer Les Vivants Premiere - 73rd Venice Film Festival","alt":"Reparer Les Vivants Premiere - 73rd Venice Film Festival","caption":"VENICE, ITALY - SEPTEMBER 04:  Actress Emmanuelle Seigner attends the premiere of Reparer Les Vivants during the 73rd Venice Film Festival at Sala Darsena on September 4, 2016 in Venice, Italy.  (Photo by Andreas Rentz\/Getty Images)","copyright":"2016 Getty Images"},"items":[{"id":"images\/33452","file":"2016\/09\/GettyImages-599086726_master-1.jpg","status":"clean","service":"content","attributes":{"title":"Reparer Les Vivants Premiere - 73rd Venice Film Festival","alt":"Reparer Les Vivants Premiere - 73rd Venice Film Festival","caption":"VENICE, ITALY - SEPTEMBER 04:  Actress Emmanuelle Seigner attends the premiere of Reparer Les Vivants during the 73rd Venice Film Festival at Sala Darsena on September 4, 2016 in Venice, Italy.  (Photo by Andreas Rentz\/Getty Images)","copyright":"2016 Getty Images"},"tags":[],"info":{"height":750,"width":500,"size":175482,"format":"jpg","created":"2017-12-08T08:40:24+00:00","cached":1512722424,"source":"\/danijelapilic\/files\/2016\/09\/GettyImages-599086726_master-1.jpg","custom":"\/\/files\/2016\/09\/GettyImages-599086726_master-1.jpg"}}]}