PALM SPRINGS, CA - JANUARY 02:  Actress Saoirse Ronan attends the 27th Annual Palm Springs International Film Festival Awards Gala at Palm Springs Convention Center on January 2, 2016 in Palm Springs, California.  (Photo by Jason Merritt/Getty Images for PSIFF)