{"defaults":{"title":"17th Annual Screen Actors Guild Awards - Arrivals","alt":"17th Annual Screen Actors Guild Awards - Arrivals","caption":"LOS ANGELES, CA - JANUARY 30:  Actress Robin Wright arrives at the 17th Annual Screen Actors Guild Awards held at The Shrine Auditorium on January 30, 2011 in Los Angeles, California.  (Photo by Jason Merritt\/Getty Images) *** Local Caption *** Robin Wright","copyright":"2011 Getty Images"},"items":[{"id":"images\/4846","file":"2011\/02\/108629417.jpg","status":"clean","service":"content","attributes":{"title":"17th Annual Screen Actors Guild Awards - Arrivals","alt":"17th Annual Screen Actors Guild Awards - Arrivals","caption":"LOS ANGELES, CA - JANUARY 30:  Actress Robin Wright arrives at the 17th Annual Screen Actors Guild Awards held at The Shrine Auditorium on January 30, 2011 in Los Angeles, California.  (Photo by Jason Merritt\/Getty Images) *** Local Caption *** Robin Wright","copyright":"2011 Getty Images"},"tags":[],"info":{"height":"776","width":"500","size":366360,"format":"jpg","created":"2017-12-08T08:39:42+00:00","cached":1512722382,"source":"\/danijelapilic\/files\/2011\/02\/108629417.jpg","custom":"\/\/files\/2011\/02\/108629417.jpg"}}]}