NEW YORK, NY - NOVEMBER 06:  Model Gisele Bündchen attends the WSJ. Magazine's 'Innovator Of The Year' Awards 2013 at The Museum of Modern Art on November 6, 2013 in New York City.  (Photo by Dimitrios Kambouris/Getty Images)