WEIMAR, GERMANY - JULY 23: (L-R) Actors Hannah Herzsprung, Florian Stetter and Henriette Confurius pose at the German premiere of the film 'Die geliebten Schwestern' at Cinestar on July 23, 2014 in Weimar, Germany.  (Photo by Jens-Ulrich Koch/Getty Images)