{"defaults":{"title":"83rd Annual Academy Awards - Arrivals","alt":"83rd Annual Academy Awards - Arrivals","caption":"HOLLYWOOD, CA - FEBRUARY 27:  Singer Celine Dion arrives at the 83rd Annual Academy Awards held at the Kodak Theatre on February 27, 2011 in Hollywood, California.  (Photo by John Shearer\/Getty Images) *** Local Caption *** Celine Dion","copyright":"2011 Getty Images"},"items":[{"id":"images\/5182","file":"2011\/03\/109479676.jpg","status":"clean","service":"content","attributes":{"title":"83rd Annual Academy Awards - Arrivals","alt":"83rd Annual Academy Awards - Arrivals","caption":"HOLLYWOOD, CA - FEBRUARY 27:  Singer Celine Dion arrives at the 83rd Annual Academy Awards held at the Kodak Theatre on February 27, 2011 in Hollywood, California.  (Photo by John Shearer\/Getty Images) *** Local Caption *** Celine Dion","copyright":"2011 Getty Images"},"tags":[],"info":{"height":"750","width":"500","size":354840,"format":"jpg","created":"2017-12-08T08:39:42+00:00","cached":1512722382,"source":"\/danijelapilic\/files\/2011\/03\/109479676.jpg","custom":"\/\/files\/2011\/03\/109479676.jpg"}}]}