LOS ANGELES, CA - JANUARY 30: Actress Rachel McAdams attends The 22nd Annual Screen Actors Guild Awards at The Shrine Auditorium on January 30, 2016 in Los Angeles, California. 25650_018  (Photo by Christopher Polk/Getty Images for Turner)