CANNES, FRANCE - MAY 12:  Julia Roberts attends the 'Money Monster' photocall during the 69th annual Cannes Film Festival at the Palais des Festivals on May 12, 2016 in Cannes, France.  (Photo by Pascal Le Segretain/Getty Images)